Copyright: ALogon (c)1993 Babarsoft


ALogon: Automatic Windows NT Login Module

(c)1993 Babarsoft, 6/19/93 by Mark Gamber

ALogon allows you to specify a default Domain, User Name and User Password to use when the logon window appears during the Windows NT boot process or after logging off. Simply enter the names you want as default values or leave a field blank if not required for logging on the system.  Check the "Enable Automatic Logon" button to bypass the logon window altogether, allowing you to boot straight in Windows NT.

If "Enable Automatic Logon" is checked, you must make sure AUTOADMN.EXE is in the Program Manager's Startup group so it runs after the desktop is started. Failing to do so will allow you to bypass the logon window once, but next time you logoff or reboot, you will need to log in normally as the settings have been lost.

Note: This program may be distributed free of charge but it is not public domain. No guarentees that it will work in every situation are implied. In using the software, the user agrees to indemnify and hold harmless the software and author from any damages incurred.